ø CDM

z(Gal)=3 z=0 z(Gal)=2 z=0

z(Gal)=1 z=0 z(Gal)=0 z=0

Ω = 1, h = 0.5, Γ=0.21, σ_8=0.6, L=8500km/s Kauffmann, Colberg, Diaferio & White (1998)