Figure 3. The z=0 galaxy distribution in ΛCDM (left panel) and τ CDM (right panel) cosmologies. The region shown is the same as in Fig. 1. We plot all galaxies brighter than M_B < −19.5 and M_B < −21.3 in ΛCDM and τ CDM respectively. This criterion selects ∼ 3500 galaxies in both cases. The size of the symbols scales with the B-band luminosity and the colours follow B − V index. 1 cm represents ∼ 14 h^{−1} Mpc.